Figure 1. A bilayer film seen through the crystal face on which it formed. Molecule AK has a hydrophilic end A that binds to the crystal in a regular pattern and a hydrophobic end K. Molecule g binds to the K end of AK and to other g molecules to repeat the pattern and strengthen the film. When the film is peeled off the crystal it can sometimes curl into a microtubule.