 Table 2. Mid-Latitude summer (July) atmosphere.
           after Anderson et al. (1985)

H(km) P(Mb)   T(K)  Ntot(/cm3)  H2O(ppmv) O3(ppmv)
0.    1013.   294.2  2.496E+19  1.88E+04  3.02E-02
1.    902.    289.7  2.257E+19  1.38E+04  3.34E-02
2.    802.    285.2  2.038E+19  9.68E+03  3.69E-02
3.    710.    279.2  1.843E+19  5.98E+03  4.22E-02
4.    628.    273.2  1.666E+19  3.81E+03  4.82E-02
5.    554.    267.2  1.503E+19  2.23E+03  5.51E-02
6.    487.    261.2  1.351E+19  1.51E+03  6.41E-02
7.    426.    254.7  1.212E+19  1.02E+03  7.76E-02
8.    372.    248.2  1.086E+19  6.46E+02  9.13E-02
9.    324.    241.7  9.716E+18  4.13E+02  1.11E-01
10.   281.    235.3  8.656E+18  2.47E+02  1.30E-01
11.   243.    228.8  7.698E+18  9.56E+01  1.79E-01
12.   209.    222.3  6.814E+18  2.94E+01  2.23E-01
13.   179.    215.8  6.012E+18  8.00E+00  3.00E-01
14.   153.    215.7  5.141E+18  5.00E+00  4.40E-01
15.   130.    215.7  4.368E+18  3.40E+00  5.00E-01
16.   111.    215.7  3.730E+18  3.30E+00  6.00E-01
17.   95.0    215.7  3.192E+18  3.20E+00  7.00E-01
18.   81.2    216.8  2.715E+18  3.15E+00  1.00E+00
19.   69.5    217.9  2.312E+18  3.20E+00  1.50E+00
20.   59.5    219.2  1.967E+18  3.30E+00  2.00E+00
21.   51.0    220.4  1.677E+18  3.45E+00  2.40E+00
22.   43.7    221.6  1.429E+18  3.60E+00  2.90E+00
23.   37.6    222.8  1.223E+18  3.85E+00  3.40E+00
24.   32.2    223.9  1.042E+18  4.00E+00  4.00E+00
25.   27.7    225.1  8.919E+17  4.20E+00  4.80E+00
27.5  19.07   228.5  6.050E+17  4.45E+00  6.00E+00
30.   13.2    233.7  4.094E+17  4.70E+00  7.00E+00
32.5  9.30    239.0  2.820E+17  4.85E+00  8.10E+00
35.   6.52    245.2  1.927E+17  4.95E+00  8.90E+00
37.5  4.64    251.3  1.338E+17  5.00E+00  8.70E+00
40.   3.33    257.5  9.373E+16  5.10E+00  7.55E+00
42.5  2.41    263.7  6.624E+16  5.30E+00  5.90E+00
45.   1.76    269.9  4.726E+16  5.45E+00  4.50E+00
47.5  1.29    275.2  3.390E+16  5.50E+00  3.50E+00
50.   .951    275.7  2.500E+16  5.50E+00  2.80E+00
55.   .515    269.3  1.386E+16  5.35E+00  1.80E+00
60.   .272    257.1  7.668E+15  5.00E+00  1.30E+00
65.   .139    240.1  4.196E+15  4.40E+00  8.00E-01
70.   .0671   218.1  2.227E+15  3.70E+00  4.00E-01
75.   .0300   196.1  1.109E+15  2.95E+00  1.90E-01
80.   .0120   174.1  4.996E+14  2.10E+00  2.00E-01
85.   .00448  165.1  1.967E+14  1.33E+00  5.70E-01
90.   .00164  165.0  7.204E+13  8.50E-01  7.50E-01
95.   .000625 178.3  2.541E+13  5.40E-01  7.00E-01
100.  .000258 190.5  9.816E+12  4.00E-01  4.00E-01